From f202dcd2586346e5ff59e533d334ec9c1ab3ae6b Mon Sep 17 00:00:00 2001
From: Paul Jungeblut <paul.jungeblut@gmail.com>
Date: Wed, 6 Jan 2016 17:42:22 +0100
Subject: Removing Edmonds Karp since capacity scaling is faster.

---
 graph/graph.tex | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'graph/graph.tex')

diff --git a/graph/graph.tex b/graph/graph.tex
index f23db82..8ac82e5 100644
--- a/graph/graph.tex
+++ b/graph/graph.tex
@@ -74,9 +74,6 @@ Erkennt negative Zyklen.
 
 \subsection{Max-Flow}
 
-\subsubsection{\textsc{Edmonds-Karp}-Algorithmus}
-\lstinputlisting{graph/edmondsKarp.cpp}
-
 \subsubsection{Capacity Scaling}
 \lstinputlisting{graph/capacityScaling.cpp}
 
-- 
cgit v1.2.3

